0 100 200 300 400 0

.0005

.001

.0015

Time

2q - Reference 2r - no art. visc.

2r

2q7 - inertial frame

2q7

2q2 - closed inner bc 2q12 - r = 0.4 - 2.5 2s5 - 256 x 256 Grid

2s5

2q10 - 4 x art.vis